-- 
-- Table structure for table `lvlupgain`
-- 

DROP TABLE IF EXISTS `lvlupgain`;
CREATE TABLE `lvlupgain` (
  `classid` int(3) NOT NULL default '0',
  `defaulthpbase` decimal(5,1) NOT NULL default '0.0',
  `defaulthpadd` decimal(4,2) NOT NULL default '0.00',
  `defaulthpmod` decimal(4,2) NOT NULL default '0.00',
  `defaultcpbase` decimal(5,1) NOT NULL default '0.0',
  `defaultcpadd` decimal(4,2) NOT NULL default '0.00',
  `defaultcpmod` decimal(4,2) NOT NULL default '0.00',
  `defaultmpbase` decimal(5,1) NOT NULL default '0.0',
  `defaultmpadd` decimal(4,2) NOT NULL default '0.00',
  `defaultmpmod` decimal(4,2) NOT NULL default '0.00',
  `class_lvl` int(3) NOT NULL default '0',
  PRIMARY KEY  (`classid`)
) ENGINE=MyISAM;

-- 
-- Dumping data for table `lvlupgain`
-- 

INSERT INTO `lvlupgain` VALUES 
(0, 80.0, 11.83, 0.37, 32.0, 4.73, 0.22, 30.0, 5.46, 0.14, 1),
(1, 327.0, 33.00, 0.37, 261.6, 26.40, 0.22, 144.0, 9.90, 0.14, 20),
(2, 1044.0, 49.40, 0.37, 939.6, 44.46, 0.22, 359.1, 19.50, 0.14, 40),
(3, 1044.0, 54.60, 0.37, 835.2, 43.68, 0.22, 359.1, 19.50, 0.14, 40),
(4, 327.0, 29.70, 0.37, 196.2, 17.82, 0.22, 144.0, 9.90, 0.14, 20),
(5, 972.3, 46.80, 0.37, 583.3, 28.08, 0.22, 359.1, 19.50, 0.14, 40),
(6, 972.3, 46.80, 0.37, 583.3, 28.08, 0.22, 359.1, 19.50, 0.14, 40),
(7, 327.0, 27.50, 0.37, 130.8, 11.00, 0.22, 144.0, 9.90, 0.14, 20),
(8, 924.5, 41.60, 0.37, 369.8, 16.64, 0.22, 359.1, 19.50, 0.14, 40),
(9, 924.5, 44.20, 0.37, 647.1, 30.94, 0.22, 359.1, 19.50, 0.14, 40),
(10, 101.0, 15.57, 0.37, 50.5, 7.84, 0.22, 40.0, 7.38, 0.14, 1),
(11, 424.0, 27.60, 0.37, 212.0, 13.85, 0.22, 192.0, 13.30, 0.14, 20),
(12, 1021.5, 45.60, 0.37, 510.7, 22.85, 0.22, 478.8, 26.10, 0.14, 40),
(13, 1021.5, 45.60, 0.37, 510.7, 22.85, 0.22, 478.8, 26.10, 0.14, 40),
(14, 1021.5, 49.50, 0.37, 612.9, 29.74, 0.22, 478.8, 26.10, 0.14, 40),
(15, 424.0, 34.20, 0.37, 212.0, 17.15, 0.22, 192.0, 13.30, 0.14, 20),
(16, 1164.9, 49.50, 0.37, 815.4, 34.68, 0.22, 478.8, 26.10, 0.14, 40),
(17, 1164.9, 53.40, 0.37, 582.4, 26.75, 0.22, 478.8, 26.10, 0.14, 40),
(18, 89.0, 12.74, 0.37, 35.6, 5.00, 0.22, 30.0, 5.46, 0.14, 1),
(19, 355.0, 33.00, 0.37, 177.5, 16.50, 0.22, 144.0, 9.90, 0.14, 20),
(20, 1072.0, 52.00, 0.37, 643.2, 31.20, 0.22, 359.1, 19.50, 0.14, 40),
(21, 1072.0, 54.60, 0.37, 536.0, 27.30, 0.22, 359.1, 19.50, 0.14, 40),
(22, 355.0, 30.80, 0.37, 142.0, 12.32, 0.22, 144.0, 9.90, 0.14, 20),
(23, 1024.2, 46.80, 0.37, 409.6, 18.72, 0.22, 359.1, 19.50, 0.14, 40),
(24, 1024.2, 49.40, 0.37, 512.1, 24.70, 0.22, 359.1, 19.50, 0.14, 40),
(25, 104.0, 15.57, 0.37, 52.0, 7.84, 0.22, 40.0, 7.38, 0.14, 1),
(26, 427.0, 28.70, 0.37, 213.5, 14.40, 0.22, 192.0, 13.30, 0.14, 20),
(27, 1048.4, 48.20, 0.37, 524.2, 24.15, 0.22, 478.8, 26.10, 0.14, 40),
(28, 1048.4, 50.80, 0.37, 629.0, 30.52, 0.22, 478.8, 26.10, 0.14, 40),
(29, 427.0, 35.30, 0.37, 213.5, 17.70, 0.22, 192.0, 13.30, 0.14, 20),
(30, 1191.8, 54.70, 0.37, 595.9, 27.40, 0.22, 478.8, 26.10, 0.14, 40),
(31, 94.0, 13.65, 0.37, 37.6, 5.46, 0.22, 30.0, 5.46, 0.14, 1),
(32, 379.0, 35.20, 0.37, 189.5, 17.60, 0.22, 144.0, 9.90, 0.14, 20),
(33, 1143.8, 54.60, 0.37, 686.2, 32.76, 0.22, 359.1, 19.50, 0.14, 40),
(34, 1143.8, 58.50, 0.37, 571.9, 29.25, 0.22, 359.1, 19.50, 0.14, 40),
(35, 379.0, 33.00, 0.37, 151.6, 13.20, 0.22, 144.0, 9.90, 0.14, 20),
(36, 1096.0, 49.40, 0.37, 438.4, 19.76, 0.22, 359.1, 19.50, 0.14, 40),
(37, 1096.0, 52.00, 0.37, 548.0, 26.00, 0.22, 359.1, 19.50, 0.14, 40),
(38, 106.0, 15.57, 0.37, 53.0, 7.84, 0.22, 40.0, 7.38, 0.14, 1),
(39, 429.0, 29.80, 0.37, 214.5, 14.95, 0.22, 192.0, 13.30, 0.14, 20),
(40, 1074.3, 48.20, 0.37, 537.1, 24.15, 0.22, 478.8, 26.10, 0.14, 40),
(41, 1074.3, 52.10, 0.37, 644.5, 31.30, 0.22, 478.8, 26.10, 0.14, 40),
(42, 429.0, 36.40, 0.37, 214.5, 18.25, 0.22, 192.0, 13.30, 0.14, 20),
(43, 1217.7, 54.70, 0.37, 608.8, 27.40, 0.22, 478.8, 26.10, 0.14, 40),
(44, 80.0, 12.64, 0.37, 40.0, 6.27, 0.22, 30.0, 5.36, 0.14, 1),
(45, 346.0, 35.10, 0.37, 242.2, 24.54, 0.22, 144.0, 9.80, 0.14, 20),
(46, 1110.8, 57.10, 0.37, 777.5, 39.94, 0.22, 359.1, 19.40, 0.14, 40),
(47, 346.0, 32.90, 0.37, 173.0, 16.40, 0.22, 144.0, 9.80, 0.14, 20),
(48, 1063.0, 54.50, 0.37, 531.5, 27.20, 0.22, 359.1, 19.40, 0.14, 40),
(49, 95.0, 15.47, 0.37, 47.5, 7.74, 0.22, 40.0, 7.28, 0.14, 1),
(50, 418.0, 35.20, 0.37, 209.0, 17.60, 0.22, 192.0, 13.20, 0.14, 20),
(51, 1182.8, 53.30, 0.37, 946.2, 42.64, 0.22, 478.8, 26.00, 0.14, 40),
(52, 1182.8, 53.30, 0.37, 591.4, 26.65, 0.22, 478.8, 26.00, 0.14, 40),
(53, 80.0, 12.64, 0.37, 56.0, 8.82, 0.22, 30.0, 5.36, 0.14, 1),
(54, 346.0, 35.10, 0.37, 242.2, 24.54, 0.22, 144.0, 9.80, 0.14, 20),
(55, 1110.8, 57.10, 0.37, 777.5, 39.94, 0.22, 359.1, 19.40, 0.14, 40),
(56, 346.0, 32.90, 0.37, 276.8, 26.30, 0.22, 144.0, 9.80, 0.14, 20),
(57, 1063.0, 54.50, 0.37, 850.4, 43.58, 0.22, 359.1, 19.40, 0.14, 40),
(88, 3061.8, 63.08, 0.37, 2755.6, 56.77, 0.22, 1155.6, 24.90, 0.14, 76),
(89, 3274.2, 69.72, 0.37, 2619.3, 55.78, 0.22, 1155.6, 24.90, 0.14, 76),
(90, 2883.9, 59.76, 0.37, 1730.3, 35.86, 0.22, 1155.6, 24.90, 0.14, 76),
(91, 2883.9, 59.76, 0.37, 1730.3, 35.86, 0.22, 1155.6, 24.90, 0.14, 76),
(92, 2729.9, 56.44, 0.37, 1910.9, 39.51, 0.22, 1155.6, 24.90, 0.14, 76),
(93, 2623.7, 53.12, 0.37, 1049.4, 21.25, 0.22, 1155.6, 24.90, 0.14, 76),
(94, 2880.0, 58.10, 0.37, 1440.0, 29.05, 0.22, 1540.8, 33.20, 0.14, 76),
(95, 2880.0, 58.10, 0.37, 1440.0, 29.05, 0.22, 1540.8, 33.20, 0.14, 76),
(96, 3039.3, 63.08, 0.37, 1823.5, 37.85, 0.22, 1540.8, 33.20, 0.14, 76),
(97, 3182.7, 63.08, 0.37, 2227.8, 44.16, 0.22, 1540.8, 33.20, 0.14, 76),
(98, 3342.0, 68.06, 0.37, 1671.0, 34.03, 0.22, 1540.8, 33.20, 0.14, 76),
(99, 3196.0, 66.40, 0.37, 1917.6, 39.84, 0.22, 1155.6, 24.90, 0.14, 76),
(100, 3302.2, 69.72, 0.37, 1651.1, 34.86, 0.22, 1155.6, 24.90, 0.14, 76),
(101, 2935.8, 59.76, 0.37, 1174.3, 23.90, 0.22, 1155.6, 24.90, 0.14, 76),
(102, 3042.0, 63.08, 0.37, 1521.0, 31.54, 0.22, 1155.6, 24.90, 0.14, 76),
(103, 3013.1, 61.42, 0.37, 1506.5, 30.71, 0.22, 1540.8, 33.20, 0.14, 76),
(104, 3119.3, 64.74, 0.37, 1871.5, 38.84, 0.22, 1540.8, 33.20, 0.14, 76),
(105, 3422.0, 69.72, 0.37, 1711.0, 34.86, 0.22, 1540.8, 33.20, 0.14, 76),
(106, 3374.0, 69.72, 0.37, 2024.4, 41.83, 0.22, 1155.6, 24.90, 0.14, 76),
(107, 3533.3, 74.70, 0.37, 1766.6, 37.35, 0.22, 1155.6, 24.90, 0.14, 76),
(108, 3113.8, 63.08, 0.37, 1245.5, 25.23, 0.22, 1155.6, 24.90, 0.14, 76),
(109, 3220.0, 66.40, 0.37, 1610.0, 33.20, 0.22, 1155.6, 24.90, 0.14, 76),
(110, 3039.0, 61.42, 0.37, 1519.5, 30.71, 0.22, 1540.8, 33.20, 0.14, 76),
(111, 3198.3, 66.40, 0.37, 1918.9, 39.84, 0.22, 1540.8, 33.20, 0.14, 76),
(112, 3447.9, 69.72, 0.37, 1723.9, 34.86, 0.22, 1540.8, 33.20, 0.14, 76),
(113, 3447.2, 72.94, 0.37, 2413.0, 51.03, 0.22, 1155.6, 24.80, 0.14, 76),
(114, 3293.2, 69.62, 0.37, 1646.6, 34.76, 0.22, 1155.6, 24.80, 0.14, 76),
(115, 3359.9, 67.96, 0.37, 2687.9, 54.35, 0.22, 1540.8, 33.10, 0.14, 76),
(116, 3359.9, 67.96, 0.37, 1679.9, 33.93, 0.22, 1540.8, 33.10, 0.14, 76),
(117, 3447.2, 72.94, 0.37, 2413.0, 51.03, 0.22, 1155.6, 24.80, 0.14, 76),
(118, 3293.2, 69.62, 0.37, 2634.5, 55.68, 0.22, 1155.6, 24.80, 0.14, 76),
-- This is only temporarly for Kamael race!
(123, 80.0, 11.83, 0.37, 32.0, 4.73, 0.22, 30.0, 5.46, 0.14, 1),
(124, 80.0, 11.83, 0.37, 32.0, 4.73, 0.22, 30.0, 5.46, 0.14, 1),
(125, 327.0, 33.00, 0.37, 261.6, 26.40, 0.22, 144.0, 9.90, 0.14, 20),
(126, 327.0, 33.00, 0.37, 261.6, 26.40, 0.22, 144.0, 9.90, 0.14, 20),
(127, 1044.0, 49.40, 0.37, 939.6, 44.46, 0.22, 359.1, 19.50, 0.14, 40),
(128, 1044.0, 49.40, 0.37, 939.6, 44.46, 0.22, 359.1, 19.50, 0.14, 40),
(129, 1044.0, 49.40, 0.37, 939.6, 44.46, 0.22, 359.1, 19.50, 0.14, 40),
(130, 1044.0, 49.40, 0.37, 939.6, 44.46, 0.22, 359.1, 19.50, 0.14, 40),
(131, 3061.8, 63.08, 0.37, 2755.6, 56.77, 0.22, 1155.6, 24.90, 0.14, 76),
(132, 3061.8, 63.08, 0.37, 2755.6, 56.77, 0.22, 1155.6, 24.90, 0.14, 76),
(133, 3061.8, 63.08, 0.37, 2755.6, 56.77, 0.22, 1155.6, 24.90, 0.14, 76),
(134, 3061.8, 63.08, 0.37, 2755.6, 56.77, 0.22, 1155.6, 24.90, 0.14, 76),
(135, 1044.0, 49.40, 0.37, 939.6, 44.46, 0.22, 359.1, 19.50, 0.14, 40),
(136, 3061.8, 63.08, 0.37, 2755.6, 56.77, 0.22, 1155.6, 24.90, 0.14, 76);